ALTER TAble Monitors MODIFY V4LMultiBuffer tinyint(1) unsigned;
ALTER TAble Monitors MODIFY ControlId int(10) unsigned;
ALTER TAble Monitors MODIFY TrackDelay smallint(5) unsigned;
ALTER TAble Monitors MODIFY ReturnDelay smallint(5) unsigned;
